import type { LucideIcon } from 'lucide-react';

interface PageHeaderProps {
  icon?: LucideIcon;
  title: string;
  subtitle?: string;
  /** Optional right-aligned actions (buttons, toggles, etc.). */
  actions?: React.ReactNode;
}

/**
 * Consistent page heading: a gradient title with an optional accent icon chip,
 * subtitle, and right-aligned action slot. Used across the library pages so
 * every screen opens the same way.
 */
export function PageHeader({ icon: Icon, title, subtitle, actions }: PageHeaderProps) {
  return (
    <div className="flex items-end justify-between gap-4 animate-rise">
      <div className="flex items-center gap-4 min-w-0">
        {Icon && (
          <div className="flex h-12 w-12 flex-none items-center justify-center rounded-2xl bg-accent/15 text-accent ring-1 ring-accent/25 shadow-lg shadow-accent/10">
            <Icon size={24} />
          </div>
        )}
        <div className="min-w-0">
          <h1 className="text-gradient truncate text-3xl font-extrabold tracking-tight sm:text-4xl">
            {title}
          </h1>
          {subtitle && <p className="mt-1 truncate text-sm text-muted">{subtitle}</p>}
        </div>
      </div>
      {actions && <div className="flex flex-none items-center gap-2">{actions}</div>}
    </div>
  );
}
